-6 - 4 - 2 0 2 4 6

0 . 0 0

0 . 0 5

0 . 1 0

0 . 1 5

0 . 2 0

V

S - 2 0

S - 2

S - 1

S

DOS

E n e r g i a

- 6 0 6

- 6 0 6

- 6 0 6

- 6 0 6

( a )